/*
  Warnings:

  - You are about to drop the column `simrs_type` on the `hospitals` table. All the data in the column will be lost.
  - You are about to drop the `vendor_histories` table. If the table is not empty, all the data it contains will be lost.

*/
-- DropForeignKey
ALTER TABLE "vendor_histories" DROP CONSTRAINT "vendor_histories_hospital_id_fkey";

-- DropForeignKey
ALTER TABLE "vendor_histories" DROP CONSTRAINT "vendor_histories_vendor_id_fkey";

-- AlterTable
ALTER TABLE "hospitals" DROP COLUMN "simrs_type";

-- DropTable
DROP TABLE "vendor_histories";

-- CreateTable
CREATE TABLE "vendor_experiences" (
    "id" TEXT NOT NULL,
    "hospital_id" TEXT NOT NULL,
    "vendor_id" TEXT,
    "status" TEXT,
    "contract_start_date" TIMESTAMP(3),
    "contract_expired_date" TIMESTAMP(3),
    "contract_value_min" BIGINT,
    "contract_value_max" BIGINT,
    "positive_notes" TEXT,
    "negative_notes" TEXT,
    "simrs_type" TEXT NOT NULL,
    "createdAt" TIMESTAMP(3) NOT NULL DEFAULT CURRENT_TIMESTAMP,
    "updatedAt" TIMESTAMP(3) NOT NULL,
    "deletedAt" TIMESTAMP(3),

    CONSTRAINT "vendor_experiences_pkey" PRIMARY KEY ("id")
);

-- AddForeignKey
ALTER TABLE "vendor_experiences" ADD CONSTRAINT "vendor_experiences_hospital_id_fkey" FOREIGN KEY ("hospital_id") REFERENCES "hospitals"("id") ON DELETE RESTRICT ON UPDATE CASCADE;

-- AddForeignKey
ALTER TABLE "vendor_experiences" ADD CONSTRAINT "vendor_experiences_vendor_id_fkey" FOREIGN KEY ("vendor_id") REFERENCES "vendors"("id") ON DELETE SET NULL ON UPDATE CASCADE;
